Crate Types

Crate Type Crate Config Location NumberPower/CrateTotal Power Central 10U CDF VIPACollision Hall 24 547.40 13137.60 Endwall 10U CDF VIPACollision Hall 4 373.80 1495.20 Plug 10U CDF VIPACollision Hall 12 523.80 6285.60 COT TDC 10U CDF VIPACollision Hall 18 1340.84 24135.06 SVX FIB Type 1 10U SVX VIPACollision Hall 2 1307.80 2615.60 SVX FIB Type 2 10U SVX VIPACollision Hall 2 684.40 1368.80 ISL FIB Type 1 10U SVX VIPACollision Hall 1 892.20 892.20 ISL FIB Type 2 10U SVX VIPACollision Hall 1 788.30 788.30 IMU Muon TDC 10U CDF VIPACollision Hall 4 653.45 2613.80 Total 68 53332.15

CMU Muon TDC 10U CDF VIPAFirst Floor 2 857.41 1714.81 CMP Muon TDC Type 110U CDF VIPAFirst Floor 1 1059.57 1059.57 CMP Muon TDC Type 210U CDF VIPAFirst Floor 1 996.86 996.86 CMX Muon TDC 10U CDF VIPAFirst Floor 2 982.21 1964.41 Hadron TDC 10U CDF VIPAFirst Floor 1 1127.45 1127.45 XFT Finder 10U CDF VIPAFirst Floor 3 988.75 2966.25 XFT Linker 10U CDF VIPAFirst Floor 3 945.00 2835.00 Muon Trigger 10U CDF VIPAFirst Floor 1 1225.00 1225.00 XTRP 10U CDF VIPAFirst Floor 2 1425.00 2850.00 DAQ VRB 10U CDF VIPAFirst Floor 6 250.00 1500.00 SVX VRB 10U SVX VIPAFirst Floor 6 420.40 2522.40 Total 28 20761.76

L1 Calorimeter 10U CDF VIPASecond Floor 6 825.00 4950.00 L1 Decision 10U CDF VIPASecond Floor 1 334.20 334.20 L2 Calorimeter 10U CDF VIPASecond Floor 6 1305.00 7830.00 L2 Decision 10U CDF VIPASecond Floor 1 112.00 112.00 L2 Control 10U CDF VIPASecond Floor 2 TSI 10U CDF VIPASecond Floor 1 349.80 349.80 Trigger XPT 10U CDF VIPASecond Floor 1 498.00 498.00 Done-Error-Busy XPT10U CDF VIPASecond Floor 1 Scalers 10U CDF VIPASecond Floor 1 205.00 205.00 SVT Hit Finder 10U SVX VIPASecond Floor 6 1105.00 6630.00 SVT Merger 10U SVX VIPASecond Floor 1 265.00 265.00

Crate Types

Crate Type Crate Config Location NumberPower/CrateTotal Power

SVT Track Fitter 10U SVX VIPASecond Floor 1 865.00 865.00

Total 28 22039.00

Grand Total 124 96132.91

Card Types

Card Type Acronym Contact Crate Config +3.3 V+5 V +12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power Typical Usage DigitalDigitalDigital DigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) Global Cards MVME J. Patrick 6U VME 2.00 10.00 Motorola 2600 CPU 2600 6U VME 0.00 Motorola 2300 CPU 2300 6U VME 0.00 ScramNet 6U VME? 0.00 Struck Scaler 7200 M. Schmidt 6U VME? 3.00 15.00 TRACER T. Shaw 10U CDF VIPA 3.00 15.00

Central ADMEM ADMEM C. Nelson 10U CDF VIPA 3.30 5.0 1.70 -5.0 0.06 15.0 0.80 -15.0 0.02 37.60 CALIB CCAL H. Williams10U CDF VIPA 3.00 5.0 -5.0 15.0 1.00 -15.0 1.00 45.00 Hadron ASD M. Cordelli 10U CDF VIPA 0.26 5.0 1.86 -5.0 1.088 15.0 -15.0 16.00 Muon ASD V. Simiatis 10U CDF VIPA 5.00 5.0 -5.0 5.00 15.0 -15.0 50.00 Muon TDC M. Campbell10U CDF VIPA SMX Readout SMXR G. Drake 10U CDF VIPA 15.00 5.0 -5.0 15.0 -15.0 75.00 COT TDC (LVDS drivers) M. Campbell10U CDF VIPA 13.61 68.07 COT External Repeater M. Binkley External Card 0.12 0.60 COT TDC Transition T. Shaw 10U CDF Trans. 0.00 COT Mezzanine Card D. Gerdes Mezzanine Card 0.19 0.93 COT TDC & Trans & Mezz 10U CDF V+R+T+M 13.92 69.60 COT TDC 10U CDF V+R 13.73 68.67

DAQ Readout DAQ VME Readout DVRB M. Bowden 10U CDF VIPA 12.00 60.00 DAQ TAXI Transition DTTM W. Stuermer10U CDF Trans. 3.00 15.00 DVRB & DTTM 10U CDF V + T 15.00 75.00

Hadron TDCs HAD Trigger Primitive E. James 10U CDF Trans. 0.04 0.19 HAD TDC & Trans & Mezz 10U CDF V+T+M 13.84 69.18

Level 1 Digital Receive & CompareDIRAC P. Wilson 10U CDF VIPA 8.00 40.00 L1 Aux P. Wilson 10U CDF Trans. 1.00 5.00 DIRAC & Aux 10U CDF V+T 9.00 45.00 L1 Crate Sum P. Wilson 10U CDF VIPA 8.00 40.00 Muon Pre-FRED E. James 10U CDF VIPA 10.00 50.00 Muon Pre-FRED & Aux 10U CDF V+T 11.00 55.00 Tower Trigger Pre-Fred P. Wilson 10U CDF VIPA 10.00 50.00 Tower Trigger PF & Aux 10U CDF V+T 11.00 55.00 Track Trigger Pre-Fred P. Wilson 10U CDF VIPA 10.00 50.00 Track Trigger PF & Aux 10U CDF V+T 11.00 55.00 ?Et Pre-Fred P. Wilson 10U CDF VIPA 10.00 50.00 ?Et Pre-Fred & Aux 10U CDF V+T 11.00 55.00

Card Types

Card Type Acronym Contact Crate Config +3.3 V+5 V +12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power

Typical Usage DigitalDigitalDigital DigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts)

FRED FRED G. Feild 10U CDF VIPA 9.00 -5.2 8.50 89.20

Level 2

Digital Clusterfinder DCAS M. Campbell10U CDF VIPA 15.00 1.00 87.00

Local Control and Sum LOCOS M. Campbell10U CDF VIPA 10.00 1.00 62.00

Neural Net Pick ISOPICK B. Blair 10U CDF VIPA 15.00 1.00 87.00

Cluster Queen CLIQUE M. Campbell10U CDF VIPA 15.00 1.00 87.00

Isocluster Queen ISOCLIQUEM. Campbell10U CDF VIPA 0.00

L2 Processor ALPHA M. Campbell10U CDF VIPA 0.00

L2 SVT M. Campbell10U CDF VIPA 0.00

L2 Track M. Campbell10U CDF VIPA 0.00

L2 Muon M. Campbell10U CDF VIPA 0.00

L2 XCES M. Campbell10U CDF VIPA 0.00

L2 Timing Control M. Campbell10U CDF VIPA 0.00

Muon TDCs

TDC (ECL drivers) M. Campbell10U CDF VIPA 13.61 -5.2 2.00 78.47

Muon Mezzanine Card D. Gerdes Mezzanine Card 0.19 0.93

CMP Trigger Primitive E. James 10U CDF Trans. 0.04 0.19

CMP TDC & Trans & Mezz 10U CDF V+T+M 13.84 -5.2 2.00 79.58

CMU Trigger Primitive E. James 10U CDF Trans. 0.07 0.37

CMU TDC & Trans & Mezz 10U CDF V+T+M 13.87 69.37

CMX Trigger Primitive E. James 10U CDF Trans. 0.07 0.37

CMX TDC & Trans & Mezz 10U CDF V+T+M 13.87 -5.2 2.00 79.77

CSP Trigger Primitive E. James 10U CDF Trans. 0.15 0.74

CSP TDC & Trans & Mezz 10U CDF V+T+M 13.95 -5.2 2.00 80.14

CSX Trigger Primitive E. James 10U CDF Trans. 0.22 1.11

CSX TDC & Trans & Mezz 10U CDF V+T+M 14.02 -5.2 2.00 80.51

BMU Trigger Primitive E. James 10U CDF Trans. 0.13 0.65

BMU TDC & Trans & Mezz 10U CDF V+T+M 13.93 69.65

WMS Trigger Primitive E. James 10U CDF Trans. 0.22 1.11

WMS TDC & Trans & Mezz 10U CDF V+T+M 14.02 70.11

BMS Trigger Primitive E. James 10U CDF Trans. 0.20 0.98

BMS TDC & Trans & Mezz 10U CDF V+T+M 13.99 69.97

TMS Trigger Primitive E. James 10U CDF Trans. 0.33 1.63

TMS TDC & Trans & Mezz 10U CDF V+T+M 14.12 70.62

Muon Trigger

Muon Match E. James 10U CDF VIPA 15.00 75.00

Muon Match Transition E. James 10U CDF Trans. 0.00

Muon Match & Trans. E. James 10U CDF V+T 15.00 75.00

Muon Pre-Match E. James 10U CDF VIPA 15.00 75.00

Trigger Summary Card E. James 10U CDF VIPA 0.00 SVX Fiber Interface Board FIB K. Woodbury10U SVX VIPA 10.00 -5.2 7.00 86.40

Card Types

Card Type Acronym Contact Crate Config +3.3 V+5 V +12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power Typical Usage DigitalDigitalDigital DigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) FIB Transition Module FTM K. Woodbury10U SVX Trans. 3.50 17.50 FIB & FTM K. Woodbury10U SVX V+T 13.50 -5.2 7.00 103.90 FIB Fanout J. Anderson10U SVX VIPA 5.00 -5.2 5.00 51.00 Silicon Readout ControllerSRC J. Oliver 10U SVX VIPA 2.00 -5.2 2.00 20.40 SVX VME Readout SVRB M. Bowden 10U SVX VIPA 10.00 50.00 SVX VRB Transition ModuleSVTM M. Bowden 10U SVX Trans. 3.00 15.00 SVRB & SVTM M. Bowden 10U SVX V+T 13.00 65.00 VRB Fanout VRBF M. Bowden 10U SVX VIPA 2.00 10.00

SVX Trigger (SVT) G-Link Receiver GRT R. Culbertson10U SVX Trans. 1.50 5.0 2.00 17.50 AM Board L. Ristori 10U SVX VIPA 16.00 80.00 AM Sequencer AMS L. Ristori 10U SVX VIPA 6.00 30.00 Hit Buffer L. Ristori 10U SVX VIPA 6.00 30.00 SVT Merger L. Ristori 10U SVX VIPA 6.00 30.00 SVT Hit Finder R. Culbertson10U SVX VIPA 14.00 70.00 SVT Track Fitter R. Culbertson10U SVX VIPA 14.00 70.00 XFT Interface L. Ristori 10U SVX VIPA 6.00 30.00

TSI & X-points Trigger Supervisor TSI A. Martin 10U CDF VIPA 5.00 -5.2 3.00 -5.2 -5.2 -5.2 40.60 Trigger X-point TXPT A. Martin 10U CDF VIPA 2.70 -5.2 6.50 -5.2 -5.2 -5.2 47.30 Done-Error-Busy X-pointDXPT A. Martin 10U CDF VIPA 2.70 -5.2 6.50 -5.2 -5.2 -5.2 47.30 Reflective Memory M. Schmidt 10U CDF VIPA? 0.00 Done Fan-In M. Schmidt 10U CDF VIPA 0.00 Done Fan-In Transition M. Schmidt 10U CDF Trans. 0.00 Done Fan-In & Trans. M. Schmidt 10U CDF V+T 0.00 0.00 XFT XFT Finder XFTF T. Shaw 10U CDF VIPA 11.79 58.97 XFT Finder Transition T. Shaw 10U CDF Trans. 0.25 1.26 XFT Finder & Trans. T. Shaw 10U CDF V+T 12.05 60.23 XFT Linker XFTL T. Shaw 10U CDF VIPA 23.00 115.00

XTRP XTRP Data M. Kasten 10U CDF VIPA 20.00 100.00 XTRP Clock M. Kasten 10U CDF VIPA 20.00 100.00 XTRP Bus-Boss M. Kasten 10U CDF VIPA 20.00 100.00

Not CDF 10U VIPA crate cards beyond this point

CDF Clock CDF Clock Fanout CCFM S. Chappa 6U Clock Fanout 2.00 -5.2 2.00 20.40 Clock Accel. Synch. CASM S. Chappa 6U Clock Fanout 3.00 1.00 1.00 -5.2 3.00 54.60 Clock Receiver CREC S. Chappa 6U Clock Fanout 1.00 -5.2 2.00 15.40

Card Types

Card Type Acronym Contact Crate Config +3.3 V+5 V +12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power

Typical Usage DigitalDigitalDigital DigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts)

Clock Selector/Fanout CSRM S. Chappa 6U Clock Fanout 0.00

Clock S. Chappa 9U Clock 1.00 -5.2 6.50 38.80

Clock PCC CPCC S. Chappa 9U Clock 1.00 1.00 1.00 -5.2 5.00 55.00

Clock Sequencer CSEQ S. Chappa 9U Clock 1.00 -5.2 14.00 77.80

Central Crate

Slot Card Type TLD Contact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick 6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 SMX ReadoutSMXR G. Drake 10U CDF VIPA 0.00 15.00 0.00 0.00 5.0 0.00 -5.0 0.00 15.0 0.00 -15.0 0.00 0.0 0.00 0.0 0.00 75.00 4 SMX ReadoutSMXR G. Drake 10U CDF VIPA 0.00 15.00 0.00 0.00 5.0 0.00 -5.0 0.00 15.0 0.00 -15.0 0.00 0.0 0.00 0.0 0.00 75.00 5 Muon ASD 0 V. Simiatis10U CDF VIPA 0.00 5.00 0.00 0.00 5.0 0.00 -5.0 5.00 15.0 0.00 -15.0 0.00 0.0 0.00 0.0 0.00 50.00 6 Muon ASD 0 V. Simiatis10U CDF VIPA 0.00 5.00 0.00 0.00 5.0 0.00 -5.0 5.00 15.0 0.00 -15.0 0.00 0.0 0.00 0.0 0.00 50.00 7 CALIB CCAL H. Williams10U CDF VIPA 0.00 3.00 0.00 0.00 5.0 0.00 -5.0 0.00 15.0 1.00 -15.0 1.00 0.0 0.00 0.0 0.00 45.00 8 CALIB CCAL H. Williams10U CDF VIPA 0.00 3.00 0.00 0.00 5.0 0.00 -5.0 0.00 15.0 1.00 -15.0 1.00 0.0 0.00 0.0 0.00 45.00 9 10 11 12 13 14 15 16Hadron ASD0 M. Cordelli10U CDF VIPA 0.00 0.26 0.00 0.00 5.0 1.86 -5.0 1.09 15.0 0.00 -15.0 0.00 0.0 0.00 0.0 0.00 16.00 17Hadron ASD0 M. Cordelli10U CDF VIPA 0.00 0.26 0.00 0.00 5.0 1.86 -5.0 1.09 15.0 0.00 -15.0 0.00 0.0 0.00 0.0 0.00 16.00 18ADMEM ADMEMC. Nelson10U CDF VIPA 0.00 3.30 0.00 0.00 5.0 1.70 -5.0 0.06 15.0 0.80 -15.0 0.02 0.0 0.00 0.0 0.00 37.60 19ADMEM ADMEMC. Nelson10U CDF VIPA 0.00 3.30 0.00 0.00 5.0 1.70 -5.0 0.06 15.0 0.80 -15.0 0.02 0.0 0.00 0.0 0.00 37.60 20ADMEM ADMEMC. Nelson10U CDF VIPA 0.00 3.30 0.00 0.00 5.0 1.70 -5.0 0.06 15.0 0.80 -15.0 0.02 0.0 0.00 0.0 0.00 37.60 21ADMEM ADMEMC. Nelson10U CDF VIPA 0.00 3.30 0.00 0.00 5.0 1.70 -5.0 0.06 15.0 0.80 -15.0 0.02 0.0 0.00 0.0 0.00 37.60 Crate Power 547.40 Supply Current 0.00 64.71 0.00 0.00 10.51 12.42 5.20 2.08 0.00 0.00 Supply Power 0.00323.56 0.00 0.00 52.56 62.08 78.00 31.20 0.00 0.00 547.40

Endwall Crate

Slot Card Type TLD Contact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1) +V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick 6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 4 5 6 7 8 9 10 11Hadron ASD0 M. Cordelli10U CDF VIPA 0.00 0.26 0.00 0.00 5.0 1.86 -5.0 1.09 15.0 0.00 -15.0 0.00 0.0 0.00 0.0 0.00 16.00 12Hadron ASD0 M. Cordelli10U CDF VIPA 0.00 0.26 0.00 0.00 5.0 1.86 -5.0 1.09 15.0 0.00 -15.0 0.00 0.0 0.00 0.0 0.00 16.00 13Hadron ASD0 M. Cordelli10U CDF VIPA 0.00 0.26 0.00 0.00 5.0 1.86 -5.0 1.09 15.0 0.00 -15.0 0.00 0.0 0.00 0.0 0.00 16.00 14ADMEM ADMEMC. Nelson10U CDF VIPA 0.00 3.30 0.00 0.00 5.0 1.70 -5.0 0.06 15.0 0.80 -15.0 0.02 0.0 0.00 0.0 0.00 37.60 15ADMEM ADMEMC. Nelson10U CDF VIPA 0.00 3.30 0.00 0.00 5.0 1.70 -5.0 0.06 15.0 0.80 -15.0 0.02 0.0 0.00 0.0 0.00 37.60 16ADMEM ADMEMC. Nelson10U CDF VIPA 0.00 3.30 0.00 0.00 5.0 1.70 -5.0 0.06 15.0 0.80 -15.0 0.02 0.0 0.00 0.0 0.00 37.60 17ADMEM ADMEMC. Nelson10U CDF VIPA 0.00 3.30 0.00 0.00 5.0 1.70 -5.0 0.06 15.0 0.80 -15.0 0.02 0.0 0.00 0.0 0.00 37.60 18ADMEM ADMEMC. Nelson10U CDF VIPA 0.00 3.30 0.00 0.00 5.0 1.70 -5.0 0.06 15.0 0.80 -15.0 0.02 0.0 0.00 0.0 0.00 37.60 19ADMEM ADMEMC. Nelson10U CDF VIPA 0.00 3.30 0.00 0.00 5.0 1.70 -5.0 0.06 15.0 0.80 -15.0 0.02 0.0 0.00 0.0 0.00 37.60 20ADMEM ADMEMC. Nelson10U CDF VIPA 0.00 3.30 0.00 0.00 5.0 1.70 -5.0 0.06 15.0 0.80 -15.0 0.02 0.0 0.00 0.0 0.00 37.60 21ADMEM ADMEMC. Nelson10U CDF VIPA 0.00 3.30 0.00 0.00 5.0 1.70 -5.0 0.06 15.0 0.80 -15.0 0.02 0.0 0.00 0.0 0.00 37.60 Crate Power 373.80 Supply Current 0.00 32.17 0.00 0.00 19.17 3.74 6.40 0.16 0.00 0.00 Supply Power 0.00160.84 0.00 0.00 95.84 18.72 96.00 2.40 0.00 0.00 373.80

Plug Crate

Slot Card Type TLD Contact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick 6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 SMX ReadoutSMXR G. Drake 10U CDF VIPA 0.00 15.00 0.00 0.00 5.0 0.00 -5.0 0.00 15.0 0.00 -15.0 0.00 0.0 0.00 0.0 0.00 75.00 4 SMX ReadoutSMXR G. Drake 10U CDF VIPA 0.00 15.00 0.00 0.00 5.0 0.00 -5.0 0.00 15.0 0.00 -15.0 0.00 0.0 0.00 0.0 0.00 75.00 5 6 7 8 9 10 11Hadron ASD0 M. Cordelli10U CDF VIPA 0.00 0.26 0.00 0.00 5.0 1.86 -5.0 1.09 15.0 0.00 -15.0 0.00 0.0 0.00 0.0 0.00 16.00 12Hadron ASD0 M. Cordelli10U CDF VIPA 0.00 0.26 0.00 0.00 5.0 1.86 -5.0 1.09 15.0 0.00 -15.0 0.00 0.0 0.00 0.0 0.00 16.00 13Hadron ASD0 M. Cordelli10U CDF VIPA 0.00 0.26 0.00 0.00 5.0 1.86 -5.0 1.09 15.0 0.00 -15.0 0.00 0.0 0.00 0.0 0.00 16.00 14ADMEM ADMEMC. Nelson10U CDF VIPA 0.00 3.30 0.00 0.00 5.0 1.70 -5.0 0.06 15.0 0.80 -15.0 0.02 0.0 0.00 0.0 0.00 37.60 15ADMEM ADMEMC. Nelson10U CDF VIPA 0.00 3.30 0.00 0.00 5.0 1.70 -5.0 0.06 15.0 0.80 -15.0 0.02 0.0 0.00 0.0 0.00 37.60 16ADMEM ADMEMC. Nelson10U CDF VIPA 0.00 3.30 0.00 0.00 5.0 1.70 -5.0 0.06 15.0 0.80 -15.0 0.02 0.0 0.00 0.0 0.00 37.60 17ADMEM ADMEMC. Nelson10U CDF VIPA 0.00 3.30 0.00 0.00 5.0 1.70 -5.0 0.06 15.0 0.80 -15.0 0.02 0.0 0.00 0.0 0.00 37.60 18ADMEM ADMEMC. Nelson10U CDF VIPA 0.00 3.30 0.00 0.00 5.0 1.70 -5.0 0.06 15.0 0.80 -15.0 0.02 0.0 0.00 0.0 0.00 37.60 19ADMEM ADMEMC. Nelson10U CDF VIPA 0.00 3.30 0.00 0.00 5.0 1.70 -5.0 0.06 15.0 0.80 -15.0 0.02 0.0 0.00 0.0 0.00 37.60 20ADMEM ADMEMC. Nelson10U CDF VIPA 0.00 3.30 0.00 0.00 5.0 1.70 -5.0 0.06 15.0 0.80 -15.0 0.02 0.0 0.00 0.0 0.00 37.60 21ADMEM ADMEMC. Nelson10U CDF VIPA 0.00 3.30 0.00 0.00 5.0 1.70 -5.0 0.06 15.0 0.80 -15.0 0.02 0.0 0.00 0.0 0.00 37.60 Crate Power 523.80 Supply Current 0.00 62.17 0.00 0.00 19.17 3.74 6.40 0.16 0.00 0.00 Supply Power 0.00310.84 0.00 0.00 95.84 18.72 96.00 2.40 0.00 0.00 523.80

COT TDC Crate

Slot Card Type TLDContact Crate Config +3.3 V +5 V +12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0

J. Patrick

6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 COT TDC & Trans & Mezz0 0 10U CDF V+R+T+M0.00 13.92 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.60 3 COT TDC & Trans & Mezz0 0 10U CDF V+R+T+M0.00 13.92 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.60 4 COT TDC 0 0 10U CDF V+R 0.00 13.73 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 68.67 5 COT TDC & Trans & Mezz0 0 10U CDF V+R+T+M0.00 13.92 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.60 6 COT TDC 0 0 10U CDF V+R 0.00 13.73 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 68.67 7 COT TDC & Trans & Mezz0 0 10U CDF V+R+T+M0.00 13.92 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.60 8 COT TDC 0 0 10U CDF V+R 0.00 13.73 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 68.67 9 COT TDC & Trans & Mezz0 0 10U CDF V+R+T+M0.00 13.92 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.60 10COT TDC & Trans & Mezz0 0 10U CDF V+R+T+M0.00 13.92 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.60 11TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 12COT TDC 0 0 10U CDF V+R 0.00 13.73 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 68.67 13COT TDC & Trans & Mezz0 0 10U CDF V+R+T+M0.00 13.92 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.60 14COT TDC 0 0 10U CDF V+R 0.00 13.73 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 68.67 15COT TDC & Trans & Mezz0 0 10U CDF V+R+T+M0.00 13.92 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.60 16COT TDC 0 0 10U CDF V+R 0.00 13.73 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 68.67 17COT TDC & Trans & Mezz0 0 10U CDF V+R+T+M0.00 13.92 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.60 18COT TDC 0 0 10U CDF V+R 0.00 13.73 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 68.67 19COT TDC & Trans & Mezz0 0 10U CDF V+R+T+M0.00 13.92 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.60 20COT TDC & Trans & Mezz0 0 10U CDF V+R+T+M0.00 13.92 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.60 21COT TDC & Trans & Mezz0 0 10U CDF V+R+T+M0.00 13.92 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.60 Crate Power 1340.84 Supply Current 0.00 268.17 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.001340.84 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 1340.84

SVX FIB Type 1 Crate

Slot Card TypeTLD Contact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1) +V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick 6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 3 4 5 6 7 8 9 FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 10FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 11FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 12FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 13FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 14FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 15FIB Fanout0 J. Anderson10U SVX VIPA 0.00 5.00 0.00 0.00 -5.2 5.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 51.00 16FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 17FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 18FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 19FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 20FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 21FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 Crate Power 1307.80 Supply Current 0.00169.00 0.00 0.00 89.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00845.00 0.00 0.00 462.80 0.00 0.00 0.00 0.00 0.00 1307.80

SVX FIB Type 2 Crate

Slot Card TypeTLD Contact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1) +V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick 6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 3 4 5 6 7 8 9 FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 10 11FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 12 13FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 14 15FIB Fanout0 J. Anderson10U SVX VIPA 0.00 5.00 0.00 0.00 -5.2 5.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 51.00 16 17FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 18 19FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 20 21FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 Crate Power 684.40 Supply Current 0.00 88.00 0.00 0.00 47.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00440.00 0.00 0.00 244.40 0.00 0.00 0.00 0.00 0.00 684.40

ISL FIB Type 1 Crate

Slot Card TypeTLD Contact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1) +V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick 6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 3 4 5 FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 6 7 FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 8 9 FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 10 11FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 12 13FIB Fanout0 J. Anderson10U SVX VIPA 0.00 5.00 0.00 0.00 -5.2 5.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 51.00 14 15FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 16 17FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 18 19FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 20 21FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 Crate Power 892.20 Supply Current 0.00115.00 0.00 0.00 61.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00575.00 0.00 0.00 317.20 0.00 0.00 0.00 0.00 892.20

ISL FIB Type 2 Crate

Slot Card TypeTLD Contact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1) +V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick 6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 3 4 5 6 7 FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 8 9 FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 10 11FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 12 13FIB Fanout0 J. Anderson10U SVX VIPA 0.00 5.00 0.00 0.00 -5.2 5.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 51.00 14 15FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 16 17FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 18 19FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 20 21FIB & FTM0 K. Woodbury10U SVX V+T 0.00 13.50 0.00 0.00 -5.2 7.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 103.90 Crate Power 788.30 Supply Current 0.00101.50 0.00 0.00 54.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00507.50 0.00 0.00 280.80 0.00 0.00 0.00 0.00 0.00 788.30

IMU Muon TDC Crate

Slot Card Type TLDContact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 4 5 6 7 8 9 10 11 12 13BMU TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.93 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.65 14BMU TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.93 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.65 15BMU TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.93 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.65 16BMU TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.93 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.65 17BMU TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.93 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.65 18BMU TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.93 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.65 19BMS TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.99 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.97 20BMS TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.99 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.97 21TMS TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 14.12 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.62 Crate Power 653.45 Supply Current 0.00130.69 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00653.45 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 653.45

CMU Muon TDC Crate

Slot Card Type TLDContact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 4 5 6 7 8 9 10CMU TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.37 11CMU TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.37 12CMU TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.37 13CMU TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.37 14CMU TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.37 15CMU TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.37 16CMU TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.37 17CMU TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.37 18CMU TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.37 19CMU TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.37 20CMU TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.37 21CMU TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.37 Crate Power 857.41 Supply Current 0.00171.48 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00857.41 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 857.41

CMP Muon TDC Crate

Slot Card Type TLDContact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 4 5 6 7 8 9 CMP TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.58 10CMP TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.58 11CMP TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.58 12CMP TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.58 13CMP TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.58 14CMP TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.58 15CMP TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.58 16CMP TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.58 17CMP TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.58 18CMP TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.58 19CMP TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00

0.0

0.00 0.0 0.00 79.58 20CMP TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.58 21CMP TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.58 Crate Power 1059.57 Supply Current 0.00184.87 0.00 0.00 26.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00924.37 0.00 0.00 135.20 0.00 0.00 0.00 0.00 0.00 1059.57

CSP-CSX-WMS Muon TDC Crate

Slot Card Type TLD Contact Crate Config +3.3 V+5 V+12.0 V-12.0 VVw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick 6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 4 5 6 7 WMS TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 14.02 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.11 8 WMS TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 14.02 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.11 9 CSP TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.95 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 80.14 10CSP TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.95 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 80.14 11CSP TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.95 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 80.14 12CSP TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.95 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 80.14 13TDC (ECL drivers) 0 M. Campbell10U CDF VIPA 0.00 13.61 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 78.47 14TDC (ECL drivers) 0 M. Campbell10U CDF VIPA 0.00 13.61 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 78.47 15TDC (ECL drivers) 0 M. Campbell10U CDF VIPA 0.00 13.61 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 78.47 16TDC (ECL drivers) 0 M. Campbell10U CDF VIPA 0.00 13.61 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 78.47 17CSX TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 14.02 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 80.51 18CSX TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 14.02 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 80.51 19CSX TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 14.02 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 80.51 20CSX TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 14.02 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 80.51 21 Crate Power 1121.66 Supply Current 0.00199.37 0.00 0.00 24.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00996.86 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 996.86

CMX Muon TDC Crate

Slot Card Type TLDContact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 4 5 6 7 8 9 10CMX TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.77 11CMX TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.77 12CMX TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.77 13CMX TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.77 14CMX TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.77 15CMX TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.77 16CMX TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.77 17CMX TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.77 18CMX TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.77 19CMX TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.77 20CMX TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.77 21CMX TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.87 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 79.77 Crate Power 982.21 Supply Current 0.00171.48 0.00 0.00 24.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00857.41 0.00 0.00 124.80 0.00 0.00 0.00 0.00 0.00 982.21

Hadron TDC Crate

Slot Card Type TLD Contact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick 6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 4 5 6 TDC (LVDS drivers) 0 M. Campbell10U CDF VIPA 0.00 13.61 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 68.07 7 TDC (LVDS drivers) 0 M. Campbell10U CDF VIPA 0.00 13.61 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 68.07 8 TDC (LVDS drivers) 0 M. Campbell10U CDF VIPA 0.00 13.61 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 68.07 9 TDC (LVDS drivers) 0 M. Campbell10U CDF VIPA 0.00 13.61 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 68.07 10HAD TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.18 11HAD TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.18 12HAD TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.18 13HAD TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.18 14HAD TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.18 15HAD TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.18 16HAD TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.18 17HAD TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.18 18HAD TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.18 19HAD TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.18 20HAD TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.18 21HAD TDC & Trans & Mezz0 0 10U CDF V+T+M0.00 13.84 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 69.18 Crate Power 1127.45 Supply Current 0.00225.49 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00##### 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 1127.45

XFT Finder Crate

Slot Card Type TLDContact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 4 XFT Finder & Trans.0 T. Shaw 10U CDF V+T 0.00 12.05 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 60.23 5 XFT Finder & Trans.0 T. Shaw 10U CDF V+T 0.00 12.05 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 60.23 6 XFT Finder & Trans.0 T. Shaw 10U CDF V+T 0.00 12.05 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 60.23 7 XFT Finder & Trans.0 T. Shaw 10U CDF V+T 0.00 12.05 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 60.23 8 XFT Finder & Trans.0 T. Shaw 10U CDF V+T 0.00 12.05 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 60.23 9 XFT Finder & Trans.0 T. Shaw 10U CDF V+T 0.00 12.05 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 60.23 10XFT Finder & Trans.0 T. Shaw 10U CDF V+T 0.00 12.05 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 60.23 11XFT Finder & Trans.0 T. Shaw 10U CDF V+T 0.00 12.05 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 60.23 12 13XFT Finder & Trans.0 T. Shaw 10U CDF V+T 0.00 12.05 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 60.23 14XFT Finder & Trans.0 T. Shaw 10U CDF V+T 0.00 12.05 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 60.23 15XFT Finder & Trans.0 T. Shaw 10U CDF V+T 0.00 12.05 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 60.23 16XFT Finder & Trans.0 T. Shaw 10U CDF V+T 0.00 12.05 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 60.23 17XFT Finder & Trans.0 T. Shaw 10U CDF V+T 0.00 12.05 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 60.23 18XFT Finder & Trans.0 T. Shaw 10U CDF V+T 0.00 12.05 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 60.23 19XFT Finder & Trans.0 T. Shaw 10U CDF V+T 0.00 12.05 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 60.23 20XFT Finder & Trans.0 T. Shaw 10U CDF V+T 0.00 12.05 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 60.23 21 Crate Power 988.75 Supply Current 0.00197.75 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00988.75 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 988.75

XFT Linker Crate

Slot Card TypeTLD Contact Crate Config +3.3 V +5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1) +V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 4 5 XFT LinkerXFTLT. Shaw 10U CDF VIPA 0.00 23.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 115.00 6 7 XFT LinkerXFTLT. Shaw 10U CDF VIPA 0.00 23.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 115.00 8 9 XFT LinkerXFTLT. Shaw 10U CDF VIPA 0.00 23.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 115.00 10 11XFT LinkerXFTLT. Shaw 10U CDF VIPA 0.00 23.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 115.00 12 13XFT LinkerXFTLT. Shaw 10U CDF VIPA 0.00 23.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 115.00 14 15XFT LinkerXFTLT. Shaw 10U CDF VIPA 0.00 23.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 115.00 16 17XFT LinkerXFTLT. Shaw 10U CDF VIPA 0.00 23.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 115.00 18 19XFT LinkerXFTLT. Shaw 10U CDF VIPA 0.00 23.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 115.00 20 21 Crate Power 945.00 Supply Current 0.00189.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00945.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 945.00

Muon Trigger Crate

Slot Card Type TLDContact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1) +V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 Muon Pre-Match 0 E. James10U CDF VIPA 0.00 15.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 75.00 4 Muon Pre-Match 0 E. James10U CDF VIPA 0.00 15.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 75.00 5 Muon Pre-Match 0 E. James10U CDF VIPA 0.00 15.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 75.00 6 Muon Pre-Match 0 E. James10U CDF VIPA 0.00 15.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 75.00 7 Muon Match & Trans. 0 E. James10U CDF V+T 0.00 15.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 75.00 8 Muon Match & Trans. 0 E. James10U CDF V+T 0.00 15.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 75.00 9 Muon Match & Trans. 0 E. James10U CDF V+T 0.00 15.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 75.00 10Muon Match & Trans. 0 E. James10U CDF V+T 0.00 15.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 75.00 11Muon Match & Trans. 0 E. James10U CDF V+T 0.00 15.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 75.00 12Muon Match & Trans. 0 E. James10U CDF V+T 0.00 15.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 75.00 13Muon Match & Trans. 0 E. James10U CDF V+T 0.00 15.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 75.00 14Muon Match & Trans. 0 E. James10U CDF V+T 0.00 15.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 75.00 15Muon Match & Trans. 0 E. James10U CDF V+T 0.00 15.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 75.00 16Muon Match & Trans. 0 E. James10U CDF V+T 0.00 15.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 75.00 17Muon Match & Trans. 0 E. James10U CDF V+T 0.00 15.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 75.00 18Muon Match & Trans. 0 E. James10U CDF V+T 0.00 15.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 75.00 19Trigger Summary Card0 E. James10U CDF VIPA 0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 20 21 Crate Power 1225.00 Supply Current 0.00245.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00##### 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 1225.00

XTRP Crate

Slot Card Type TLD Contact Crate Config +3.3 V +5 V +12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick 6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 XTRP Data 0 M. Kasten10U CDF VIPA 0.00 20.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 100.00 4 XTRP Data 0 M. Kasten10U CDF VIPA 0.00 20.00 0.00

0.00

0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 100.00 5 XTRP Data 0 M. Kasten10U CDF VIPA 0.00 20.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 100.00 6 XTRP Data 0 M. Kasten10U CDF VIPA 0.00 20.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 100.00 7 XTRP Data 0 M. Kasten10U CDF VIPA 0.00 20.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 100.00 8 XTRP Data 0 M. Kasten10U CDF VIPA 0.00 20.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 100.00 9 XTRP Data 0 M. Kasten10U CDF VIPA 0.00 20.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 100.00 10XTRP Data 0 M. Kasten10U CDF VIPA 0.00 20.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 100.00 11XTRP Data 0 M. Kasten10U CDF VIPA 0.00 20.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 100.00 12XTRP Data 0 M. Kasten10U CDF VIPA 0.00 20.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 100.00 13XTRP Data 0 M. Kasten10U CDF VIPA 0.00 20.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 100.00 14XTRP Data 0 M. Kasten10U CDF VIPA 0.00 20.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 100.00 15XTRP Clock 0 M. Kasten10U CDF VIPA 0.00 20.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 100.00 16XTRP Bus-Boss0 M. Kasten10U CDF VIPA 0.00 20.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 100.00 17 18 19 20 21 Crate Power 1425.00 Supply Current 0.00 285.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.001425.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 1425.00

DAQ VRB Crate

Slot Card Type TLDContact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1) +V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17DVRB & DTTM0 0 10U CDF V + T 0.00 15.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 75.00 18 19DVRB & DTTM0 0 10U CDF V + T 0.00 15.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 75.00 20 21DVRB & DTTM0 0 10U CDF V + T 0.00 15.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 75.00 Crate Power 250.00 Supply Current 0.00 50.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00250.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 250.00

SVX VRB Crate

Slot Card Type TLD Contact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 Motorola 2600 CPU 2600 0 6U VME 0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 2 Motorola 2300 CPU 2300 0 6U VME 0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 3 ScramNet 0 0 6U VME? 0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 4 N/A 5 6 7 Silicon Readout ControllerSRCJ. Oliver 10U SVX VIPA 0.00 2.00 0.00 0.00 -5.2 2.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 20.40 8 N/A 9 SVRB & SVTM 0 M. Bowden10U SVX V+T 0.00 13.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 65.00 10 11SVRB & SVTM 0 M. Bowden10U SVX V+T 0.00 13.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 65.00 12 13SVRB & SVTM 0 M. Bowden10U SVX V+T 0.00 13.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 65.00 14 15VRB Fanout VRBFM. Bowden10U SVX VIPA 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 16 17SVRB & SVTM 0 M. Bowden10U SVX V+T 0.00 13.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 65.00 18 19SVRB & SVTM 0 M. Bowden10U SVX V+T 0.00 13.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 65.00 20 21SVRB & SVTM 0 M. Bowden10U SVX V+T 0.00 13.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 65.00 Crate Power 420.40 Supply Current 0.00 82.00 0.00 0.00 2.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00410.00 0.00 0.00 10.40 0.00 0.00 0.00 0.00 0.00 420.40

L1 Calorimeter Crate

Slot Card Type TLDContact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1) +V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 4 DIRAC & Aux0 0 10U CDF V+T 0.00 9.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 45.00 5 DIRAC & Aux0 0 10U CDF V+T 0.00 9.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 45.00 6 DIRAC & Aux0 0 10U CDF V+T 0.00 9.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 45.00 7 DIRAC & Aux0 0 10U CDF V+T 0.00 9.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 45.00 8 L1 Crate Sum 0 P. Wilson10U CDF VIPA 0.00 8.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 40.00 9 DIRAC & Aux0 0 10U CDF V+T 0.00 9.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 45.00 10DIRAC & Aux0 0 10U CDF V+T 0.00 9.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 45.00 11DIRAC & Aux0 0 10U CDF V+T 0.00 9.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 45.00 12DIRAC & Aux0 0 10U CDF V+T 0.00 9.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 45.00 13DIRAC & Aux0 0 10U CDF V+T 0.00 9.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 45.00 14DIRAC & Aux0 0 10U CDF V+T 0.00 9.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 45.00 15DIRAC & Aux0 0 10U CDF V+T 0.00 9.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 45.00 16DIRAC & Aux0 0 10U CDF V+T 0.00 9.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 45.00 17L1 Crate Sum 0 P. Wilson10U CDF VIPA 0.00 8.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 40.00 18DIRAC & Aux0 0 10U CDF V+T 0.00 9.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 45.00 19DIRAC & Aux0 0 10U CDF V+T 0.00 9.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 45.00 20DIRAC & Aux0 0 10U CDF V+T 0.00 9.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 45.00 21DIRAC & Aux0 0 10U CDF V+T 0.00 9.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 45.00 Crate Power 825.00 Supply Current 0.00165.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00825.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 825.00

L1 Decision Crate

Slot Card Type TLD Contact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 4 ?Et Pre-Fred & Aux0 0 10U CDF V+T 0.00 11.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 55.00 5 Tower Trigger PF & Aux0 0 10U CDF V+T 0.00 11.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 55.00 6 Muon Pre-FRED & Aux0 0 10U CDF V+T 0.00 11.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 55.00 7 Track Trigger PF & Aux0 0 10U CDF V+T 0.00 11.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 55.00 8 FRED FREDG. Feild 10U CDF VIPA 0.00 9.00 0.00 0.00 -5.2 8.50 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 89.20 9 N/A 10Spare Pre-FRED 11Spare Pre-FRED 12 13 14 15 16 17 18 19 20 21 Crate Power 334.20 Supply Current 0.00 58.00 0.00 0.00 8.50 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00290.00 0.00 0.00 44.20 0.00 0.00 0.00 0.00 0.00 334.20

L2 Calorimeter Crate

Slot Card Type TLD Contact Crate Config +3.3 V +5 V +12.0 V-12.0 VVw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick 6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 Digital ClusterfinderDCAS M. Campbell10U CDF VIPA 0.00 15.00 1.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 87.00 4 Digital ClusterfinderDCAS M. Campbell10U CDF VIPA 0.00 15.00 1.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 87.00 5 Digital ClusterfinderDCAS M. Campbell10U CDF VIPA 0.00 15.00 1.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 87.00 6 Digital ClusterfinderDCAS M. Campbell10U CDF VIPA 0.00 15.00 1.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 87.00 7 Digital ClusterfinderDCAS M. Campbell10U CDF VIPA 0.00 15.00 1.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 87.00 8 Digital ClusterfinderDCAS M. Campbell10U CDF VIPA 0.00 15.00 1.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 87.00 9 Local Control and SumLOCOSM. Campbell10U CDF VIPA 0.00 10.00 1.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 62.00 10Digital ClusterfinderDCAS M. Campbell10U CDF VIPA 0.00 15.00 1.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 87.00 11Digital ClusterfinderDCAS M. Campbell10U CDF VIPA 0.00 15.00 1.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 87.00 12Digital ClusterfinderDCAS M. Campbell10U CDF VIPA 0.00 15.00 1.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 87.00 13Digital ClusterfinderDCAS M. Campbell10U CDF VIPA 0.00 15.00 1.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 87.00 14Digital ClusterfinderDCAS M. Campbell10U CDF VIPA 0.00 15.00 1.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 87.00 15Digital ClusterfinderDCAS M. Campbell10U CDF VIPA 0.00 15.00 1.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 87.00 16Neural Net Pick ISOPICKB. Blair 10U CDF VIPA 0.00 15.00 1.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 87.00 17Cluster Queen CLIQUEM. Campbell10U CDF VIPA 0.00 15.00 1.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 87.00 18 19 20 21 Crate Power 1305.00 Supply Current 0.00 225.00 15.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.001125.00180.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 1305.00

L2 Decision Crate

Slot Card Type TLD Contact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick 6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 L2 Processor ALPHA M. Campbell10U CDF VIPA 0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 4 L2 SVT 0 M. Campbell10U CDF VIPA 0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 5 L2 Track 0 M. Campbell10U CDF VIPA 0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 6 L2 Muon 0 M. Campbell10U CDF VIPA 0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 7 L2 XCES 0 M. Campbell10U CDF VIPA 0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 8 L2 Timing Control 0 M. Campbell10U CDF VIPA 0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 9 Cluster Queen CLIQUE M. Campbell10U CDF VIPA 0.00 15.00 1.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 87.00 10Isocluster QueenISOCLIQUEM. Campbell10U CDF VIPA 0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 11 12 13 14 15 16 17 18 19 20 21 Crate Power 112.00 Supply Current 0.00 20.00 1.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00100.00 12.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 112.00

L2 Control Crate

Slot Card TypeTLDContact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1) +V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 Crate Power 25.00 Supply Current 0.00 5.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00 25.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 25.00

TSI Crate

Slot Card Type TLDContact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 Trigger SupervisorTSI A. Martin10U CDF VIPA 0.00 5.00 0.00 0.00 -5.2 3.00 -5.2 0.00 -5.2 0.00 -5.2 0.00 0.0 0.00 0.0 0.00 40.60 4 Trigger SupervisorTSI A. Martin10U CDF VIPA 5.00 -5.2 3.00 40.60 5 Trigger SupervisorTSI A. Martin10U CDF VIPA 5.00 -5.2 3.00 40.60 6 Trigger SupervisorTSI A. Martin10U CDF VIPA 5.00 -5.2 3.00 40.60 7 Trigger SupervisorTSI A. Martin10U CDF VIPA 5.00 -5.2 3.00 40.60 8 Trigger SupervisorTSI A. Martin10U CDF VIPA 5.00 -5.2 3.00 40.60 9 Trigger SupervisorTSI A. Martin10U CDF VIPA 5.00 -5.2 3.00 40.60 10Trigger SupervisorTSI A. Martin10U CDF VIPA 5.00 -5.2 3.00 40.60 11 12 13 14 15 16 17 18 19 20 21 Crate Power 349.80 Supply Current 0.00 45.00 0.00 0.00 24.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00225.00 0.00 0.00 124.80 0.00 0.00 0.00 0.00 0.00 349.80

Trigger XPT Crate

Slot Card Type TLD Contact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1) +V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 Trigger X-pointTXPTA. Martin10U CDF VIPA 0.00 2.70 0.00 0.00 -5.2 6.50 -5.2 0.00 -5.2 0.00 -5.2 0.00 0.0 0.00 0.0 0.00 47.30 4 Trigger X-pointTXPTA. Martin10U CDF VIPA 0.00 2.70 0.00 0.00 -5.2 6.50 -5.2 0.00 -5.2 0.00 -5.2 0.00 0.0 0.00 0.0 0.00 47.30 5 Trigger X-pointTXPTA. Martin10U CDF VIPA 0.00 2.70 0.00 0.00 -5.2 6.50 -5.2 0.00 -5.2 0.00 -5.2 0.00 0.0 0.00 0.0 0.00 47.30 6 Trigger X-pointTXPTA. Martin10U CDF VIPA 0.00 2.70 0.00 0.00 -5.2 6.50 -5.2 0.00 -5.2 0.00 -5.2 0.00 0.0 0.00 0.0 0.00 47.30 7 Trigger X-pointTXPTA. Martin10U CDF VIPA 0.00 2.70 0.00 0.00 -5.2 6.50 -5.2 0.00 -5.2 0.00 -5.2 0.00 0.0 0.00 0.0 0.00 47.30 8 Trigger X-pointTXPTA. Martin10U CDF VIPA 0.00 2.70 0.00 0.00 -5.2 6.50 -5.2 0.00 -5.2 0.00 -5.2 0.00 0.0 0.00 0.0 0.00 47.30 9 Trigger X-pointTXPTA. Martin10U CDF VIPA 0.00 2.70 0.00 0.00 -5.2 6.50 -5.2 0.00 -5.2 0.00 -5.2 0.00 0.0 0.00 0.0 0.00 47.30 10Trigger X-pointTXPTA. Martin10U CDF VIPA 0.00 2.70 0.00 0.00 -5.2 6.50 -5.2 0.00 -5.2 0.00 -5.2 0.00 0.0 0.00 0.0 0.00 47.30 11Trigger X-pointTXPTA. Martin10U CDF VIPA 0.00 2.70 0.00 0.00 -5.2 6.50 -5.2 0.00 -5.2 0.00 -5.2 0.00 0.0 0.00 0.0 0.00 47.30 12Trigger X-pointTXPTA. Martin10U CDF VIPA 0.00 2.70 0.00 0.00 -5.2 6.50 -5.2 0.00 -5.2 0.00 -5.2 0.00 0.0 0.00 0.0 0.00 47.30 13 14 15 16 17 18 19 20 21 Crate Power 498.00 Supply Current 0.00 32.00 0.00 0.00 65.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00160.00 0.00 0.00 338.00 0.00 0.00 0.00 0.00 0.00 498.00

Done-Error-Busy XPT Crate

Slot Card Type TLD Contact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick 6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 Reflective Memory 0 M. Schmidt10U CDF VIPA?0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 3 Done Fan-In & Trans.0 M. Schmidt10U CDF V+T 0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 0.00 4 Done Fan-In & Trans.0 M. Schmidt10U CDF V+T 0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 0.00 5 Done Fan-In & Trans.0 M. Schmidt10U CDF V+T 0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 0.00 6 Done Fan-In & Trans.0 M. Schmidt10U CDF V+T 0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 0.00 7 Done Fan-In & Trans.0 M. Schmidt10U CDF V+T 0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 0.00 8 Done Fan-In & Trans.0 M. Schmidt10U CDF V+T 0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 0.00 9 Done Fan-In & Trans.0 M. Schmidt10U CDF V+T 0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 0.00 10Done Fan-In & Trans.0 M. Schmidt10U CDF V+T 0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 0.00 11Done Fan-In & Trans.0 M. Schmidt10U CDF V+T 0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 0.00 12Done Fan-In & Trans.0 M. Schmidt10U CDF V+T 0.00 0.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.00 0.00 0.00 0.00 0.00 13Done-Error-Busy X-pointDXPTA. Martin10U CDF VIPA 0.00 2.70 0.00 0.00 -5.2 6.50 -5.2 0.00 -5.2 0.00 -5.2 0.00 0.00 0.00 0.00 0.00 47.30 14Done-Error-Busy X-pointDXPTA. Martin10U CDF VIPA 0.00 2.70 0.00 0.00 -5.2 6.50 -5.2 0.00 -5.2 0.00 -5.2 0.00 0.00 0.00 0.00 0.00 47.30 15Done-Error-Busy X-pointDXPTA. Martin10U CDF VIPA 0.00 2.70 0.00 0.00 -5.2 6.50 -5.2 0.00 -5.2 0.00 -5.2 0.00 0.00 0.00 0.00 0.00 47.30 16Done-Error-Busy X-pointDXPTA. Martin10U CDF VIPA 0.00 2.70 0.00 0.00 -5.2 6.50 -5.2 0.00 -5.2 0.00 -5.2 0.00 0.00 0.00 0.00 0.00 47.30 17Done-Error-Busy X-pointDXPTA. Martin10U CDF VIPA 0.00 2.70 0.00 0.00 -5.2 6.50 -5.2 0.00 -5.2 0.00 -5.2 0.00 0.00 0.00 0.00 0.00 47.30 18Done-Error-Busy X-pointDXPTA. Martin10U CDF VIPA 0.00 2.70 0.00 0.00 -5.2 6.50 -5.2 0.00 -5.2 0.00 -5.2 0.00 0.00 0.00 0.00 0.00 47.30 19Done-Error-Busy X-pointDXPTA. Martin10U CDF VIPA 0.00 2.70 0.00 0.00 -5.2 6.50 -5.2 0.00 -5.2 0.00 -5.2 0.00 0.00 0.00 0.00 0.00 47.30 20Done-Error-Busy X-pointDXPTA. Martin10U CDF VIPA 0.00 2.70 0.00 0.00 -5.2 6.50 -5.2 0.00 -5.2 0.00 -5.2 0.00 0.00 0.00 0.00 0.00 47.30 21Done-Error-Busy X-pointDXPTA. Martin10U CDF VIPA 0.00 2.70 0.00 0.00 -5.2 6.50 -5.2 0.00 -5.2 0.00 -5.2 0.00 0.00 0.00 0.00 0.00 47.30 Crate Power 435.70 Supply Current 0.00 26.30 0.00 0.00 58.50 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00131.50 0.00 0.00 304.20 0.00 0.00 0.00 0.00 0.00 435.70

Scalers Crate

Slot Card Type TLD Contact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1) +V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick 6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 Struck Scaler7200M. Schmidt6U VME? 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 4 Struck Scaler7200M. Schmidt6U VME? 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 5 Struck Scaler7200M. Schmidt6U VME? 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 6 Struck Scaler7200M. Schmidt6U VME? 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 7 Struck Scaler7200M. Schmidt6U VME? 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 8 Struck Scaler7200M. Schmidt6U VME? 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 9 Struck Scaler7200M. Schmidt6U VME? 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 10Struck Scaler7200M. Schmidt6U VME? 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 11Struck Scaler7200M. Schmidt6U VME? 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 12Struck Scaler7200M. Schmidt6U VME? 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 13Struck Scaler7200M. Schmidt6U VME? 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 14Struck Scaler7200M. Schmidt6U VME? 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 15 16 17 18 19 20 21 Crate Power 205.00 Supply Current 0.00 41.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00205.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 205.00

SVT Hit Finder

Slot Card Type TLD Contact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1)+V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick 6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 SVT Hit Finder0 R. Culbertson10U SVX VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 4 SVT Hit Finder0 R. Culbertson10U SVX VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 5 SVT Hit Finder0 R. Culbertson10U SVX VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 6 SVT Merger 0 L. Ristori 10U SVX VIPA 0.00 6.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 30.00 7 AM Board 0 L. Ristori 10U SVX VIPA 0.00 16.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 80.00 8 AM Board 0 L. Ristori 10U SVX VIPA 0.00 16.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 80.00 9 AM Board 0 L. Ristori 10U SVX VIPA 0.00 16.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 80.00 10AM SequencerAMSL. Ristori 10U SVX VIPA 0.00 6.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 30.00 11Hit Buffer 0 L. Ristori 10U SVX VIPA 0.00 6.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 30.00 12 13SVT Hit Finder0 R. Culbertson10U SVX VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 14SVT Hit Finder0 R. Culbertson10U SVX VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 15SVT Hit Finder0 R. Culbertson10U SVX VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 16SVT Merger 0 L. Ristori 10U SVX VIPA 0.00 6.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 30.00 17AM Board 0 L. Ristori 10U SVX VIPA 0.00 16.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 80.00 18AM Board 0 L. Ristori 10U SVX VIPA 0.00 16.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 80.00 19AM Board 0 L. Ristori 10U SVX VIPA 0.00 16.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 80.00 20AM SequencerAMSL. Ristori 10U SVX VIPA 0.00 6.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 30.00 21Hit Buffer 0 L. Ristori 10U SVX VIPA 0.00 6.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 30.00 Crate Power 1105.00 Supply Current 0.00221.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00##### 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 1105.00

SVT Merger

Slot Card TypeTLDContact Crate Config +3.3 V +5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1) +V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 4 SVT Merger0 L. Ristori10U SVX VIPA 0.00 6.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 30.00 5 6 SVT Merger0 L. Ristori10U SVX VIPA 0.00 6.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 30.00 7 8 SVT Merger0 L. Ristori10U SVX VIPA 0.00 6.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 30.00 9 10SVT Merger0 L. Ristori10U SVX VIPA 0.00 6.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 30.00 11 12SVT Merger0 L. Ristori10U SVX VIPA 0.00 6.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 30.00 13 14SVT Merger0 L. Ristori10U SVX VIPA 0.00 6.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 30.00 15 16SVT Merger0 L. Ristori10U SVX VIPA 0.00 6.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 30.00 17 18SVT Merger0 L. Ristori10U SVX VIPA 0.00 6.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 30.00 19 20 21 Crate Power 265.00 Supply Current 0.00 53.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00265.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 265.00

SVT Track Fitter

Slot Card Type TLD Contact Crate Config +3.3 V+5 V+12.0 V-12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1) +V2 I(+V2)Total Power DigitalDigitalDigitalDigitalAnalogAnalogAnalogAnalogAnalogAnalogAnalogAnalogDigitalDigitalDigitalDigital (watts) 1 MVME 0 J. Patrick 6U VME 0.00 2.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 10.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 SVT Track Fitter0 R. Culbertson10U SVX VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 4 SVT Track Fitter0 R. Culbertson10U SVX VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 5 SVT Track Fitter0 R. Culbertson10U SVX VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 6 SVT Track Fitter0 R. Culbertson10U SVX VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 7 SVT Track Fitter0 R. Culbertson10U SVX VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 8 SVT Track Fitter0 R. Culbertson10U SVX VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 9 SVT Track Fitter0 R. Culbertson10U SVX VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 10SVT Track Fitter0 R. Culbertson10U SVX VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 11SVT Track Fitter0 R. Culbertson10U SVX VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 12SVT Track Fitter0 R. Culbertson10U SVX VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 13SVT Track Fitter0 R. Culbertson10U SVX VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 14SVT Track Fitter0 R. Culbertson10U SVX VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 15 16 17 18 19 20 21 Crate Power 865.00 Supply Current 0.00173.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 Supply Power 0.00865.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 865.00