CDF Calorimeter Trigger Upgrade24 phi x 24 eta towers x 2 had/em 24 phi x 2 eta towers Wall/Central Overlap10 bits parallel Et per tower (128 GeV FS)

Calorimeter

1200links

L2 CALCluster Finder

L1CAL6 Crates96 DIRAC cards

24 cables10bits SEt

288cables

Global Level 24 Towers/cable

from XTRP24 cables 8 bits track info./cable

12 cables16 bits Trig Summary

Global Level 11 Crate6 Crates72 DCAS cards1 Crate