HALT(RUN*)RECOVER(RESET)CDF_CLK

B0Digitize

Fastout

0123L1R

L1APhototube

InputLatch

41403942

ADMEM:

DIRAC:

Al_FIFOIN

Al_FIFOOUT

L1_FIFOIN

L1_FIFOOUT

0123Clock:

TSI/TRACER:0123456789101112131415161718192021

414039420123456789101112131415161718192021

30292831

29282730

0123456789101112

01234567891011

26252427

0123456789

33323134

0123456789101112131415

26252423

35 clks < Dt (Run-B0) < 159 clksDt (Recover-Run) ~ 10ms

PJW 6/7/96