RUN II TRIGGER SYSTEMDetector Elements

GLOBAL LEVEL 1L1 CALCOT

XFT MUONMUONPRIM.L1MUON

L2 CAL

CALXTRPL1TRACKSVX SVTCESXCES

PJW 9/23/96

GLOBAL LEVEL 2TSI/CLK