XTRP Extrapolation to L1CAL

total of 12memories:one per input XFT track

Memory126 pt1 sign1 iso1 sl

8Memory126 pt1 sign1 iso1 sl

86 x 8

88to/from adjacent wedge

6 x 8

6x86x88Eight6 inputOR gatesEight14 inputOR gatesEight6 inputOR gates

toDIRACboard 8