SVT Tracking

Slot Card Type TLD Contact Crate Config +3.3 V +5 V +12.0 V -12.0 V Vw I(Vw) Vx I(Vx) Vy I(Vy) Vz I(Vz) +V1 I(+V1) +V2 I(+V2) Total Power Digital Digital Digital Digital Analog Analog Analog Analog Analog Analog Analog Analog Digital Digital Digital Digital (watts) 1 MVME 0 J. Patrick 6U VME 0.00 7.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 35.00 2 TRACER 0 T. Shaw 10U CDF VIPA 0.00 3.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 15.00 3 Spy 0 L. Ristori 10U CDF VIPA 0.00 6.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 30.00 4 SVT Hit Finder & VTM 0 0 10U CDF VIPA 6.60 13.50 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 89.28 5 SVT Hit Finder & VTM 0 0 10U CDF VIPA 6.60 13.50 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 89.28 6 SVT Hit Finder & VTM 0 0 10U CDF VIPA 6.60 13.50 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 89.28 7 SVT Merger 0 L. Ristori 10U CDF VIPA 0.00 6.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 30.00 8 AM Sequencer AMS A. Clark 10U CDF VIPA 0.00 4.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 20.00 9 AM Board 0 L. Ristori 10U CDF VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 10 AM Board 0 L. Ristori 10U CDF VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 11 Hit Buffer 0 L. Ristori 10U CDF VIPA 0.00 6.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 30.00 12 13 SVT Hit Finder & VTM 0 0 10U CDF VIPA 6.60 13.50 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 89.28 14 SVT Hit Finder & VTM 0 0 10U CDF VIPA 6.60 13.50 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 89.28 15 SVT Hit Finder & VTM 0 0 10U CDF VIPA 6.60 13.50 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 89.28 16 SVT Merger 0 L. Ristori 10U CDF VIPA 0.00 6.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 30.00 17 AM Sequencer AMS A. Clark 10U CDF VIPA 0.00 4.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 20.00 18 AM Board 0 L. Ristori 10U CDF VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 19 AM Board 0 L. Ristori 10U CDF VIPA 0.00 14.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 70.00 20 Hit Buffer 0 L. Ristori 10U CDF VIPA 0.00 6.00 0.00 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 0.0 0.00 30.00 21 Crate Power 1055.68 Supply Current 39.60 185.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 Supply Power 130.68 925.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 0.00 1055.68

Page 1 of 1 10/8/98 9:50 AM