SVT Hit Finder Bill of Materials Revised 1999-05-09 by WJA

Item Pkg # per percent Reference # Vendor Part Number Marking Description Package board spares Comment Tz1 Tz2 01 General InstrumentsTZORB 9736 9736 5KP5.0A transient suppressor axial lead 2 15 TC1-3,5-18 02 3M #2520-6002 20-pin header .100" × .100" low-prof 17 15 U102 03 TI 74AS00 AS00 Quad 2-input NAND SOIC 14 1 15 U77,78,103 04 Philips 74HCT00D 74HCT00D Quad 2-input NAND SO14 3 15 U70,71,72,100 05 TI SN74BCT760DW BCT760 Octal O/C buffer SOIC 20 4 15 U79 06 Philips 74HCT08 74HCT08D Quad AND gate SOIC 14 1 15 U104,105,106,107 07 Harris 74HCT244 HCT244 Octal buffer SOIC 20 4 15 U69 08 DataDelay DDU7C-400 DDU7C-400 10 tap 400ns delay line DIP 16 1 15 U82 09a Digikey A463-ND Socket for 4-pin osc DIP 8 1 15 (U82) 09b Digikey SE1822-ND 30.000 MHz Oscillator DIP 8 1 0 DO NOT INSTALL U85 10 TI SN74CBT3257 multiplexer SOIC 16 1 15 C5-11 11a Cal-Chip GMC31X7R225K25NT 2.2 uF 50V capacitor 1206 7 0 equivalent part OK C12-17 11b Novacap 1206N470J101N 47 pF 100V capacitor 1206 6 0 equivalent part OK C3V1-60,62-91,96-125 12 Cal-Chip GMC31X7R104J50NT 0.1 uF 50V capacitor 1206 120 0 equivalent part OK C5V1-60,62-91,124-140 12 Cal-Chip GMC31X7R104J50NT 0.1 uF 50V capacitor 1206 107 0 equivalent part OK C5V148,155,156 12 Cal-Chip GMC31X7R104J50NT 0.1 uF 50V capacitor 1206 3 0 equivalent part OK C3V92-95 C5V92-94,96 13 Digikey PCT 3106 CT 10 uF 16V electrolytic capacitor SMD 8 0 equivalent part OK FP2 FP3 14a AMP 499141-1 2x5 connector (angled) 2 15 FP1 14b AMP 499160-1 2x5 connector (straight) 1 15 FP2 FP3 screws 14c 3-56 x 3/8 screw SS sltd pan head mach screw 3-56 x 3/8 4 0 FP2 FP3 nuts 14d 3-56 nut SS nut 3-56 4 0 P3 15a ERNI #64785 064785 110-pin connector 1 0 provided by U of C P3 15b ERNI #64179 064179 125-pin connector 1 0 provided by U of C FPC1 FPC2 16a KEL #8822E-052-171H 8225 52-pin connector 2 0 provided by U of C FPC1 FPC2 screws 16b screw 4 0 exact part TBD FPC1 FPC2 nuts 16c nut 4 0 exact part TBD P1 P2 17a Harting #0201 160 2101 160-pin connector 2 0 provided by U of C P1 P2 screws 17b 3-56 x 3/8 screw SS sltd pan head mach screw 3-56 x 3/8 4 0 P1 P2 nuts 17c 3-56 nut SS nut 3-56 4 0 P0 18 ERNI #64784 064784 95-pin connector 1 0 provided by U of C U59-68 19 Cypress CY7C4245-10ASC CY7C4245-10ASC FIFO A64 (10x10 TQFP 64) 10 15 U58 20 Intel DA28F320J5-100 DA28F320J5 StrataFlash FRAM SSOP 56 1 15 U46-57 21 National DS90C031TM DS90C031TM quad LVDS driver M16A (SOP 16) 12 15 U44 U45 22 National DS90C032TM DS90C032TM quad LVDS receiver M16A (SOP 16) 2 15 U86 23a Advanced InterconnectionsKS324-85GG 8-pin peel-a-way socket DIP 8 1 15 (U86) 23b Altera EPC1-PC8 EPC1 DIP 8 1 0 DO NOT INSTALL U91 U92 24 Altera EPF10K30AQC240-1 EPF10K30AQC240-1 FPGA PQFP 240 2 15 U30,32-41,84 25 Altera EPF10K50VBC356-2 EPF10K50VBC356-2 FPGA BGA 356 12 15 U101 26 Altera EPM7512AEQC208-7 EPM7512AEQC208-7 CPLD PQFP 208 1 15 F1_3.3V F2_3.3V 28 AMP 2-331272-6 spring socket 2 15 F1_5V F2_5V 28 AMP 2-331272-6 spring socket 2 15 S2 29 Grayhill 76SB10 76SB10 10-bit DIP switch DIP 20 1 15 U19-28 30 Samsung KM681002AJ-12 KM681002AJ-12 CMOS SRAM 128Kx8 32-SOJ-400 10 0 provided by U of C LED1 31a ELMA 90-1801-2731 LED (R/Y) 1 15 LED4 LED5 31b ELMA 90-1801-8231 LED (R/G) 2 15 LED2 LED3 32 ELMA 90-1882-2781 LED (G/Y/R) 2 15 U7-18 33 Motorola MCM69F618CTQ9 MCM69F618CTQ9 BurstRAM 64Kx18 TQFP 100 12 0 provided by U of C U80 U81 34 DataDelay MDU38F-10 MDU38F-10 10ns delay DIP 8 2 15 U108 35 DataDelay MDU38F-50 MDU38F-50 50ns delay DIP 8 1 15 R44-49 36a 56 ohm resistor 560 56 ohm resistor 1206 6 0 equivalent part OK R28 R29 36b 390 ohm resistor 390 ohm resistor 1206 2 0 equivalent part OK R4,R38-42 36c 1K resistor 1001 1K resistor 1206 6 0 equivalent part OK R10,11,13-17,21-25 36c 1K resistor 1001 1K resistor 1206 12 0 equivalent part OK R33-37,50-59 36c 1K resistor 1001 1K resistor 1206 15 0 equivalent part OK R30-32 R43 36d 10K resistor 1002 10K resistor 1206 4 0 equivalent part OK R9,12,18,19,20,26,27 36e 100K resistor 1003 100K resistor 1206 7 0 equivalent part OK R5-8 36f 1M resistor 105 1M resistor 1206 4 0 equivalent part OK U5,6,87,88,89,90 37 TI SN74ABTE16245DL ABTE16245 16 bit transceiver SOIC 48 6 15 U1-4 38 Philips 74HCT123D Monostable SO16 4 15 S1 39 jumper 1 15 exact part TBD RC1 RC2 40 CMD PRC202750K500M CMD9735 RC network 75 ohm / 50 pF SOIC 20 2 15 TP1-10 41 Newark 52F7279 type 5002 miniature PC test point 0.100" x 0.100" 10 15